Article 3
1
Products intended for animal feed may enter for use in the Community from third countries, be put into circulation and/or used in the Community only if they are sound, genuine and of merchantable quality and therefore when correctly used do not represent any danger to human health, animal health or to the environment or could adversely affect livestock production.
2
In particular, products intended for animal feed shall be deemed not to be in conformity with paragraph 1 if the level of undesirable substances they contain does not comply with the maximum levels laid down in Annex I.