Temporary authorisation
Article 6
By way of derogation from the requirements of Article 5(4), a temporary authorisation to operate, valid for no more than 12 months, may be issued by the competent authority for newly established terminals. The terminal must however demonstrate its plan to implement a quality management system in accordance with the ISO 9001:2000 standard or equivalent standard, as set out in Article 5(4).