CHAPTER V

Exchanges of information and rapid intervention situations
Article 11
1
Where a Member State takes measures which restrict the placing on the market of products — or require their withdrawal or recall — such as those provided for in Article 8(1)(b) to (f), the Member State shall, to the extent that such notification is not required under Article 12 or any specific Community legislation, inform the Commission of the measures, specifying its reasons for adopting them. It shall also inform the Commission of any modification or lifting of such measures.
If the notifying Member State considers that the effects of the risk do not or cannot go beyond its territory, it shall notify the measures concerned insofar as they involve information likely to be of interest to Member States from the product safety standpoint, and in particular if they are in response to a new risk which has not yet been reported in other notifications.
In accordance with the procedure laid down in Article 15(3) of this Directive, the Commission shall, while ensuring the effectiveness and proper functioning of the system, adopt the guidelines referred to in point 8 of Annex II. These shall propose the content and standard form for the notifications provided for in this Article, and, in particular, shall provide precise criteria for determining the conditions for which notification is relevant for the purposes of the second subparagraph.
2
The Commission shall forward the notification to the other Member States, unless it concludes, after examination on the basis of the information contained in the notification, that the measure does not comply with Community law. In such a case, it shall immediately inform the Member State which initiated the action.