Directive 2001/85/EC of the European Parliament and of the Council
of 20 November 2001
relating to special provisions for vehicles used for the carriage of passengers comprising more than eight seats in addition to the driver's seat, and amending Directives 70/156/EEC and 97/27/EC (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EC) No 661/2009 of the European Parliament and of the Council of 13 July 2009 concerning type-approval requirements for the general safety of motor vehicles, their trailers and systems, components and separate technical units intended therefor (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I SCOPE, DEFINITIONS, APPLICATION FOR EC VEHICLE TYPE-APPROVAL OR SEPARATE TECHNICAL UNIT TYPE-APPROVAL OF A BODYWORK, MODIFICATIONS OF VEHICLE OR BODYWORK TYPE, CONFORMITY OF PRODUCTION AND REQUIREMENTS

1. SCOPE
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. DEFINITIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.15.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.15.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.15.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.35. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.36. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.37. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.38. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.39. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. APPLICATION FOR EC TYPE-APPROVAL OF A VEHICLE OR OF A BODYWORK AS A SEPARATE TECHNICAL UNIT
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. GRANTING OF EC VEHICLE TYPE-APPROVAL
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.4. Markings
4.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. MODIFICATION OF THE TYPES AND AMENDMENTS TO APPROVAL
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. CONFORMITY OF PRODUCTION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. REQUIREMENTS

7.1. General
7.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2. Area available for passengers
7.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3. Marking of vehicles
7.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3.3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.4. Stability test
7.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.5.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.5. Protection against fire risks

7.5.1. Engine compartment
7.5.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.5.2. Electrical equipment and wiring
7.5.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.5.3. Batteries
7.5.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.5.4. Fire extinguishers and first-aid equipment
7.5.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.5.5. Materials
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6. Exits

7.6.1. Number of exits
7.6.1.1.
7.6.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.11.

7.6.2. Siting of exits
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.3. Minimum dimensions of exits
7.6.3.1.
7.6.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.4. Technical requirements for all service doors
7.6.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.4.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.5. Additional technical requirements for power-operated service doors
7.6.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.1.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.6.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.5.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.6. Additional technical requirements for automatically operated service doors
7.6.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.6.4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.7. Technical requirements for emergency doors
7.6.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.7.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.7.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.7.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.8. Technical requirements for emergency windows
7.6.8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.8.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.8.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.8.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.8.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.8.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.9. Technical requirements for escape hatches
7.6.9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.9.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.9.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.9.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.10. Technical requirements for retractable steps
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.10.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.11. Markings
7.6.11.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.11.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.11.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.11.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7. Interior arrangements

7.7.1. Access to service doors (see Annex III, figure 1)
7.7.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.8.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.1.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.2. Access to emergency doors (see Annex III, figure 5)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.3. Access to emergency windows
7.7.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.4. Access to escape hatches

7.7.4.1. Escape hatches in the roof
7.7.4.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.4.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.4.2. Escape hatches in the floor
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.5. Gangways (see Annex III, figure 6)
7.7.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.1.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.6. Slope of gangway
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.7. Steps (see Annex III, figure 8)
7.7.7.1. 7.7.7.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.7.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.7.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.7.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.7.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.8. Passenger seats and space for seated passengers
7.7.8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.4.1.
7.7.8.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.5.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.8.6.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.9. Communication with the driver
7.7.9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.10. Hot-drink machines and cooking equipment
7.7.10.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.10.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.11. Doors to interior compartments
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.11.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.11.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.11.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.11.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.8. Artificial lighting
7.8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.9. Articulated section of articulated vehicles
7.9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.10. Direction-holding of articulated vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.11. Handrails and handholds

7.11.1. General requirements
7.11.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.11.2. Handrails and handholds for standing passengers
7.11.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.11.3. Handrails and handholds for service doors
7.11.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.3.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.11.4. Handrails to priority seating
7.11.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.12. Guarding of step wells
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.13. Baggage racks and occupant protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.14. Trap doors, if fitted
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.15. Visual entertainment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix VERIFICATION OF STATIC TILTING LIMIT BY MEANS OF CALCULATION
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Preparations for calculation
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Validity of the calculation method.
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II EC TYPE-APPROVAL DOCUMENTATION

Appendix 1
Information documents

Subappendix 1

Subappendix 2

Subappendix 3

Appendix 2

Subappendix 1

Addendum to EC type-approval certificate No …
concerning the EC type-approval of a vehicle with regard to Directive …/…/EC as last amended by Directive …/…/EC

Subappendix 2

Addendum to EC type-approval certificate No …
concerning the EC type-approval of a bodywork as a separate technical unit with regard to Directive …/…/EC as last amended by Directive …/…/EC

Subappendix 3

Addendum to EC type-approval certificate No …
concerning the EC type-approval for a vehicle type fitted with a bodywork already approved as a separate technical unit with regard to Directive …/…/EC as last amended by Directive …/…/EC

ANNEX III EXPLANATORY DIAGRAMS
(All dimensions shown in mm)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Overall length, l
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Overall width, b
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Overall height, h
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV STRENGTH OF SUPERSTRUCTURE

1. Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. General specifications and requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Test methods
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Residual space
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Interpretation of test results
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 1 ROLL-OVER TEST ON A COMPLETE VEHICLE

1. Test condition
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Test procedure (see figure 1)
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 2 ROLL-OVER TEST ON A BODYWORK SECTION

1. Test conditions
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Test procedure
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 3 PENDULUM TEST ON A BODYWORK SECTION

1. Energy level and direction of impact
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Test conditions
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Description of the pendulum
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Subappendix 1 Calculation of total energy (E*)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Calculation of total energy (E*)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Subappendix 2 Requirements for the distribution of the main energy absorbing parts of the superstructure
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 4 VERIFICATION OF STRENGTH OF SUPERSTRUCTURE BY CALCULATION
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Preparations for calculation
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Tests of section of superstructure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V (See Annex I, paragraph 7.6.5.6.1.1)
GUIDELINES FOR MEASURING THE CLOSING FORCES OF POWER-OPERATED DOORS

1. General
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Definitions
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Measurements
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Measuring device
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI SPECIAL REQUIREMENTS FOR VEHICLES HAVING A CAPACITY NOT EXCEEDING 22 PASSENGERS

1.1. Minimum dimensions for exits
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Siting of exits
1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII REQUIREMENTS FOR TECHNICAL DEVICES FACILITATING ACCESS FOR PASSENGERS WITH REDUCED MOBILITY

1. GENERAL
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. SCOPE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. REQUIREMENTS

3.1. Steps
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Priority seats and space for passengers with reduced mobility
3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Communication devices
3.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4. Pictograms
3.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.5. Floor slope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.6. Wheelchair accommodation provisions
3.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.7. Seats in the wheelchair space
3.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.8. Stability of wheelchairs
3.8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.8.1.2.1. In forward direction in the case of a separate wheelchair and wheelchair user restraint system
3.8.1.2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.1.2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.8.1.2.2. In forward direction in the case of a combined wheelchair and wheelchair user restraint system
3.8.1.2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.1.2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.1.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.6.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.8.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.10.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.10.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.10.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.10.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.9. Door controls
3.9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.10. Lighting
3.10.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.11. Provisions for boarding aids

3.11.1. General requirements
3.11.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.11.2. Kneeling system
3.11.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.11.3. Lift
3.11.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.3.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.11.4. Ramp
3.11.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11.4.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VIII SPECIAL REQUIREMENTS FOR DOUBLE-DECK VEHICLES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.5.5. Fire extinguishers and first-aid equipment
7.5.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6. Exits

7.6.1. Number of exits
7.6.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.1.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.2. Siting of exits
7.6.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.4. Technical requirements for all service doors
7.6.4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.6.7. Technical requirements for emergency doors
7.6.7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.5. Gangways (see figure 1)
7.7.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.5.10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.7. Steps
7.7.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.8.6. Free height over seating positions
7.7.8.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.7.12 Intercommunication staircase (see Annex III, figure 1)
7.7.12.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.12.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.12.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.12.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.12.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7.12.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.11. Handrails and handholds

7.11.5. Handrails and handholds for intercommunication staircases
7.11.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.5.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11.5.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.14. Guarding of stepwells and exposed seats
7.14.2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.14.3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.14.4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Appendix . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IX EC TYPE-APPROVAL FOR A SEPARATE TECHNICAL UNIT AND EC TYPE-APPROVAL OF A VEHICLE FITTED WITH A BODYWORK ALREADY APPROVED AS A SEPARATE TECHNICAL UNIT

1. Separate technical unit type-approval
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. EC type-approval of a vehicle fitted with a bodywork already approved as a separate technical unit
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .