TITLE VII

WHOLESALE DISTRIBUTION AND BROKERING OF MEDICINAL PRODUCTS
Article 81
With regard to the supply of medicinal products to pharmacists and persons authorised or entitled to supply medicinal products to the public, Member States shall not impose upon the holder of a distribution authorisation which has been granted by another Member State any obligation, in particular public service obligations, more stringent than those they impose on persons whom they have themselves authorised to engage in equivalent activities.
The holder of a marketing authorisation for a medicinal product and the distributors of the said medicinal product actually placed on the market in a Member State shall, within the limits of their responsibilities, ensure appropriate and continued supplies of that medicinal product to pharmacies and persons authorised to supply medicinal products so that the needs of patients in the Member State in question are covered.
The arrangements for implementing this Article should, moreover, be justified on grounds of public health protection and be proportionate in relation to the objective of such protection, in compliance with the Treaty rules, particularly those concerning the free movement of goods and competition.
Substituted by Directive 2004/27/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use.
Substituted by Directive 2011/62/EU of the European Parliament and of the Council of 8 June 2011 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use, as regards the prevention of the entry into the legal supply chain of falsified medicinal products (Text with EEA relevance).