TITLE VII

WHOLESALE DISTRIBUTION AND BROKERING OF MEDICINAL PRODUCTS
Article 76
1.
Without prejudice to Article 6, Member States shall take all appropriate action to ensure that only medicinal products in respect of which a marketing authorization has been granted in accordance with Community law are distributed on their territory.
2
In the case of wholesale distribution and storage, medicinal products shall be covered by a marketing authorisation granted pursuant to Regulation (EC) No 726/2004 or by the competent authorities of a Member State in accordance with this Directive.
3
Any distributor, not being the marketing authorisation holder, who imports a medicinal product from another Member State shall notify the marketing authorisation holder and the competent authority in the Member State to which the medicinal product will be imported of his intention to import that product. In the case of medicinal products which have not been granted an authorisation pursuant to Regulation (EC) No 726/2004, the notification to the competent authority shall be without prejudice to additional procedures provided for in the legislation of that Member State and to fees payable to the competent authority for examining the notification.
4
In the case of medicinal products which have been granted an authorisation pursuant to Regulation (EC) No 726/2004, the distributor shall submit the notification in accordance with paragraph 3 of this Article to the marketing authorisation holder and the Agency. A fee shall be payable to the Agency for checking that the conditions laid down in Union legislation on medicinal products and in the marketing authorisations are observed.
Inserted by Directive 2004/27/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use.
Substituted by Directive 2011/62/EU of the European Parliament and of the Council of 8 June 2011 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use, as regards the prevention of the entry into the legal supply chain of falsified medicinal products (Text with EEA relevance).