TITLE III

PLACING ON THE MARKET
CHAPTER 1

Marketing authorization
Article 7
A marketing authorization shall not be required for a radiopharmaceutical prepared at the time of use by a person or by an establishment authorized, according to national legislation, to use such medicinal products in an approved health care establishment exclusively from authorized radionuclide generators, kits or radionuclide precursors in accordance with the manufacturer's instructions.
Substituted by Directive 2004/27/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use.