TITLE IV

MANUFACTURE AND IMPORTATION
Article 47
The Commission is empowered to adopt delegated acts in accordance with Article 121a in order to supplement this Directive by specifying the principles and guidelines of good manufacturing practices for medicinal products referred to in Article 46(f).
Detailed guidelines in line with those principles will be published by the Commission and revised necessary to take account of technical and scientific progress.
The Commission shall adopt, by means of delegated acts in accordance with Article 121a and subject to the conditions laid down in Articles 121b and 121c, the principles and guidelines of good manufacturing practice for active substances referred to in the first paragraph of point (f) of Article 46 and in Article 46b.
The principles of good distribution practices for active substances referred to in the first paragraph of point (f) of Article 46 shall be adopted by the Commission in the form of guidelines.
The Commission shall adopt guidelines on the formalised risk assessment for ascertaining the appropriate good manufacturing practice for excipients referred to in the second paragraph of point (f) of Article 46.
Substituted by Directive 2011/62/EU of the European Parliament and of the Council of 8 June 2011 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use, as regards the prevention of the entry into the legal supply chain of falsified medicinal products (Text with EEA relevance).
Substituted by Regulation (EU) 2019/1243 of the European Parliament and of the Council of 20 June 2019 adapting a number of legal acts providing for the use of the regulatory procedure with scrutiny to Articles 290 and 291 of the Treaty on the Functioning of the European Union (Text with EEA relevance).