TITLE II

SCOPE
Article 4
1
Nothing in this Directive shall in any way derogate from the Community rules for the radiation protection of persons undergoing medical examination or treatment, or from the Community rules laying down the basic safety standards for the health protection of the general public and workers against the dangers of ionizing radiation.
2
This Directive shall be without prejudice to Council Decision 86/346/EEC of 25 June 1986 accepting on behalf of the Community the European Agreement on the Exchange of Therapeutic Substances of Human Origin .
3
The provisions of this Directive shall not affect the powers of the Member States' authorities either as regards the setting of prices for medicinal products or their inclusion in the scope of national health insurance schemes, on the basis of health, economic and social conditions.
4
This Directive shall not affect the application of national legislation prohibiting or restricting the sale, supply or use of medicinal products as contraceptives or abortifacients. The Member States shall communicate the national legislation concerned to the Commission.
5
This Directive and all Regulations referred to therein shall not affect the application of national legislation prohibiting or restricting the use of any specific type of human or animal cells, or the sale, supply or use of medicinal products containing, consisting of or derived from these cells, on grounds not dealt with in the aforementioned Community legislation. The Member States shall communicate the national legislation concerned to the Commission. The Commission shall make this information publicly available in a register.
OJ L 207, 30.7.1986, p. 1.
Inserted by Regulation (EC) No 1394/2007 of the European Parliament and of the Council of 13 November 2007 on advanced therapy medicinal products and amending Directive 2001/83/EC and Regulation (EC) No 726/2004 (Text with EEA relevance).