TITLE III

PLACING ON THE MARKET
CHAPTER 3

Procedures relevant to the marketing authorization
Article 23a
After a marketing authorisation has been granted, the holder of the authorisation shall inform the competent authority of the authorising Member State of the date of actual marketing of the medicinal product for human use in that Member State, taking into account the various presentations authorised.
If the product ceases to be placed on the market of a Member State, either temporarily or permanently, the marketing authorisation holder shall notify the competent authority of that Member State. Such notification shall, other than in exceptional circumstances, be made no less than two months before the interruption in the placing on the market of the product. The marketing authorisation holder shall inform the competent authority of the reasons for such action in accordance with Article 123(2).
Upon request by the competent authority, particularly in the context of pharmacovigilance, the marketing authorisation holder shall provide the competent authority with all data relating to the volume of sales of the medicinal product, and any data in his possession relating to the volume of prescriptions.
Inserted by Directive 2004/27/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use.
Substituted by Directive 2012/26/EU of the European Parliament and of the Council of 25 October 2012 amending Directive 2001/83/EC as regards pharmacovigilance (Text with EEA relevance).