TITLE XIII

GENERAL PROVISIONS
Article 126
An authorization to market a medicinal product shall not be refused, suspended or revoked except on the grounds set out in this Directive.
No decision concerning suspension of manufacture or of importation of medicinal products coming from third countries, prohibition of supply or withdrawal from the market of a medicinal product may be taken except on the grounds set out in Articles 117 and 118.