TITLE XIII

GENERAL PROVISIONS
Article 122
1
Member States shall take all appropriate measures to ensure that the competent authorities concerned communicate to each other such information as is appropriate to guarantee that the requirements placed on the authorisations referred to in Articles 40 and 77, on the certificates referred to in Article 111(5) or on the marketing authorisations are fulfilled.
2
Upon reasoned request, Member States shall send electronically the reports referred to in Article 111(3) to the competent authorities of another Member State or to the Agency.
3
The conclusions reached in accordance with Article 111(1) shall be valid throughout the Community.
However, in exceptional cases, if a Member State is unable, for reasons relating to public health, to accept the conclusions reached following an inspection under Article 111(1), that Member State shall forthwith inform the Commission and the Agency. The Agency shall inform the Member States concerned.
When the Commission is informed of these divergences of opinion, it may, after consulting the Member States concerned, ask the inspector who performed the original inspection to perform a new inspection; the inspector may be accompanied by two other inspectors from Member States which are not parties to the disagreement.
Substituted by Directive 2004/27/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use.
Substituted by Directive 2010/84/EU of the European Parliament and of the Council of 15 December 2010 amending, as regards pharmacovigilance, Directive 2001/83/EC on the Community code relating to medicinal products for human use (Text with EEA relevance).