TITLE XI

SUPERVISION AND SANCTIONS
Article 117
1
Without prejudice to the measures provided for in Article 116, Member States shall take all appropriate steps to ensure that the supply of the medicinal product is prohibited and the medicinal product withdrawn from the market, if the view is taken that:
a
the medicinal product is harmful; or
b
it lacks therapeutic efficacy; or
c
the risk-benefit balance is not favourable; or
d
its qualitative and quantitative composition is not as declared; or
e
the controls on the medicinal product and/or on the ingredients and the controls at an intermediate stage of the manufacturing process have not been carried out or if some other requirement or obligation relating to the grant of the manufacturing authorisation has not been fulfilled.
2
The competent authority may limit the prohibition to supply the product, or its withdrawal from the market, to those batches which are the subject of dispute.
3
The competent authority may, for a medicinal product for which the supply has been prohibited or which has been withdrawn from the market in accordance with paragraphs 1 and 2, in exceptional circumstances during a transitional period allow the supply of the medicinal product to patients who are already being treated with the medicinal product.
Substituted by Directive 2004/27/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use.
Substituted by Directive 2010/84/EU of the European Parliament and of the Council of 15 December 2010 amending, as regards pharmacovigilance, Directive 2001/83/EC on the Community code relating to medicinal products for human use (Text with EEA relevance).
Inserted by Directive 2010/84/EU of the European Parliament and of the Council of 15 December 2010 amending, as regards pharmacovigilance, Directive 2001/83/EC on the Community code relating to medicinal products for human use (Text with EEA relevance).