TITLE XI

SUPERVISION AND SANCTIONS
Article 115
Member States shall take all necessary measures to ensure that the manufacturing and purifying processes used in the preparation of medicinal products derived from human blood or human plasma are properly validated, attain batch-to-batch consistency and guarantee, insofar as the state of technology permits, the absence of specific viral contamination. To this end manufacturers shall notify the competent authorities of the method used to reduce or eliminate pathogenic viruses liable to be transmitted by medicinal products derived from human blood or human plasma. The competent authority may submit samples of the bulk and/or the medicinal product for testing by a State laboratory or a laboratory designated for that purpose, either during the examination of the application pursuant to Article 19, or after a marketing authorization has been granted.