TITLE XI

SUPERVISION AND SANCTIONS
Article 112
Member States shall take all appropriate measures to ensure that the holder of the marketing authorization for a medicinal product and, where appropriate, the holder of the manufacturing authorization, furnish proof of the controls carried out on the medicinal product and/or the ingredients and of the controls carried out at an intermediate stage of the manufacturing process, in accordance with the methods laid down in Article 8(3)(h).