TITLE IX

PHARMACOVIGILANCE
CHAPTER 5

Implementation, Delegation and Guidance
Article 108b
The Commission shall make public a report on the performance of pharmacovigilance tasks by the Member States on
21 July 2015
at the latest and then every 3 years thereafter.
Substituted by Directive 2010/84/EU of the European Parliament and of the Council of 15 December 2010 amending, as regards pharmacovigilance, Directive 2001/83/EC on the Community code relating to medicinal products for human use (Text with EEA relevance).