TITLE IX

PHARMACOVIGILANCE
CHAPTER 4

Supervision of post-authorisation safety studies
Article 107q
1
Based on the results of the study and after consultation of the marketing authorisation holder, the Pharmacovigilance Risk Assessment Committee may make recommendations concerning the marketing authorisation, stating the reasons on which they are based. The recommendations shall mention the divergent positions and the grounds on which they are based.
2
When recommendations for the variation, suspension or revocation of the marketing authorisation are made for a medicinal product authorised by the Member States pursuant to this Directive, the Member States represented within the coordination group shall agree a position on the matter taking into account the recommendation referred to in paragraph 1 and including a timetable for the implementation of the agreed position.
If, within the coordination group, the Member States represented reach agreement on the action to be taken by consensus, the chairman shall record the agreement and send it to the marketing authorisation holder and the Member States. The Member States shall adopt necessary measures to vary, suspend or revoke the marketing authorisation concerned in accordance with the implementation timetable determined in the agreement.
In the event that a variation is agreed upon, the marketing authorisation holder shall submit to the national competent authorities an appropriate application for a variation, including an updated summary of product characteristics and package leaflet within the determined timetable for implementation.
The agreement shall be made public on the European medicines web-portal established in accordance with Article 26 of Regulation (EC) No 726/2004.
If an agreement by consensus cannot be reached, the position of the majority of the Member States represented within the coordination group shall be forwarded to the Commission, which shall apply the procedure laid down in Articles 33 and 34.
Where the agreement reached by the Member States represented within the coordination group or the position of the majority of Member States differs from the recommendation of the Pharmacovigilance Risk Assessment Committee, the coordination group shall attach to the agreement or majority position a detailed explanation of the scientific grounds for the differences together with the recommendation.
Substituted by Directive 2010/84/EU of the European Parliament and of the Council of 15 December 2010 amending, as regards pharmacovigilance, Directive 2001/83/EC on the Community code relating to medicinal products for human use (Text with EEA relevance).