TITLE IX

PHARMACOVIGILANCE
CHAPTER 3

Recording, reporting and assessment of pharmacovigilance data
Section 2

Periodic safety update reports
Article 107g
1
In the case of a single assessment of periodic safety update reports that recommends any action concerning more than one marketing authorisation in accordance with Article 107e(1) which does not include any marketing authorisation granted in accordance with the centralised procedure provided for in Chapter 1 of Title II of Regulation (EC) No 726/2004, the coordination group shall, within 30 days of receipt of the report of the Pharmacovigilance Risk Assessment Committee, consider the report and reach a position on the maintenance, variation, suspension or revocation of the marketing authorisations concerned, including a timetable for the implementation of the agreed position.
2
If, within the coordination group, the Member States represented reach agreement on the action to be taken by consensus, the chairman shall record the agreement and send it to the marketing authorisation holder and the Member States. The Member States shall adopt necessary measures to maintain, vary, suspend or revoke the marketing authorisations concerned in accordance with the timetable for implementation determined in the agreement.
In the event of a variation, the marketing authorisation holder shall submit to the national competent authorities an appropriate application for a modification, including an updated summary of product characteristics and package leaflet within the determined timetable for implementation.
If an agreement by consensus cannot be reached, the position of the majority of the Member States represented within the coordination group shall be forwarded to the Commission which shall apply the procedure laid down in Articles 33 and 34.
Where the agreement reached by the Member States represented within the coordination group or the position of the majority of Member States differs from the recommendation of the Pharmacovigilance Risk Assessment Committee, the coordination group shall attach to the agreement or the majority position a detailed explanation of the scientific grounds for the differences together with the recommendation.
3
In the case of a single assessment of periodic safety update reports that recommends any action concerning more than one marketing authorisation in accordance with Article 107e(1) which includes at least one marketing authorisation granted in accordance with the centralised procedure provided for in Chapter 1 of Title II of Regulation (EC) No 726/2004, the Committee for Medicinal Products for Human Use shall, within 30 days of receipt of the report of the Pharmacovigilance Risk Assessment Committee, consider the report and adopt an opinion on the maintenance, variation, suspension or revocation of the marketing authorisations concerned, including a timetable for the implementation of the opinion.
Where this opinion of the Committee for Medicinal Products for Human Use differs from the recommendation of the Pharmacovigilance Risk Assessment Committee, the Committee for Medicinal Products for Human Use shall attach to its opinion a detailed explanation of the scientific grounds for the differences together with the recommendation.
4
On the basis of the opinion of the Committee for Medicinal Products for Human Use referred to in paragraph 3, the Commission shall:
a
adopt a decision addressed to the Member States concerning the measures to be taken in respect of marketing authorisations granted by the Member States and concerned by the procedure provided for in this section; and
b
where the opinion states that regulatory action concerning the marketing authorisation is necessary, adopt a decision to vary, suspend or revoke the marketing authorisations granted in accordance with the centralised procedure provided for in Regulation (EC) No 726/2004 and concerned by the procedure provided for in this section.
Articles 33 and 34 of this Directive shall apply to the adoption of the decision referred to in point (a) of the first subparagraph of this paragraph and to its implementation by the Member States.
Article 10 of Regulation (EC) No 726/2004 shall apply to the decision referred to in point (b) of the first subparagraph of this paragraph. Where the Commission adopts such decision, it may also adopt a decision addressed to the Member States pursuant to Article 127a of this Directive.
Substituted by Directive 2010/84/EU of the European Parliament and of the Council of 15 December 2010 amending, as regards pharmacovigilance, Directive 2001/83/EC on the Community code relating to medicinal products for human use (Text with EEA relevance).