TITLE IX

PHARMACOVIGILANCE
CHAPTER 3

Recording, reporting and assessment of pharmacovigilance data
Section 1

Recording and reporting of suspected adverse reactions
Article 107
1
Marketing authorisation holders shall record all suspected adverse reactions in the Union or in third countries which are brought to their attention, whether reported spontaneously by patients or healthcare professionals, or occurring in the context of a post-authorisation study.
Marketing authorisation holders shall ensure that those reports are accessible at a single point within the Union.
By way of derogation from the first subparagraph, suspected adverse reactions occurring in the context of a clinical trial shall be recorded and reported in accordance with Directive 2001/20/EC.
2
Marketing authorisation holders shall not refuse to consider reports of suspected adverse reactions received electronically or by any other appropriate means from patients and healthcare professionals.
3
Marketing authorisation holders shall submit electronically to the database and data-processing network referred to in Article 24 of Regulation (EC) No 726/2004 (hereinafter referred to as the
‘
Eudravigilance database
’
) information on all serious suspected adverse reactions that occur in the Union and in third countries within 15 days following the day on which the marketing authorisation holder concerned gained knowledge of the event.
Marketing authorisation holders shall submit electronically to the Eudravigilance database information on all non-serious suspected adverse reactions that occur in the Union, within 90 days following the day on which the marketing authorisation holder concerned gained knowledge of the event.
For medicinal products containing the active substances referred to in the list of publications monitored by the Agency pursuant to Article 27 of Regulation (EC) No 726/2004, marketing authorisation holders shall not be required to report to the Eudravigilance database the suspected adverse reactions recorded in the listed medical literature, but they shall monitor all other medical literature and report any suspected adverse reactions.
4
Marketing authorisation holders shall establish procedures in order to obtain accurate and verifiable data for the scientific evaluation of suspected adverse reaction reports. They shall also collect follow-up information on these reports and submit the updates to the Eudravigilance database.
5
Marketing authorisation holders shall collaborate with the Agency and the Member States in the detection of duplicates of suspected adverse reaction reports.
Substituted by Directive 2010/84/EU of the European Parliament and of the Council of 15 December 2010 amending, as regards pharmacovigilance, Directive 2001/83/EC on the Community code relating to medicinal products for human use (Text with EEA relevance).