TITLE III

PLACING ON THE MARKET
CHAPTER 1

Marketing authorization
Article 10
1
By way of derogation from Article 8(3)(i), and without prejudice to the law relating to the protection of industrial and commercial property, the applicant shall not be required to provide the results of pre-clinical tests and of clinical trials if he can demonstrate that the medicinal product is a generic of a reference medicinal product which is or has been authorised under Article 6 for not less than eight years in a Member State or in the Community.
A generic medicinal product authorised pursuant to this provision shall not be placed on the market until ten years have elapsed from the initial authorisation of the reference product.
The first subparagraph shall also apply if the reference medicinal product was not authorised in the Member State in which the application for the generic medicinal product is submitted. In this case, the applicant shall indicate in the application form the name of the Member State in which the reference medicinal product is or has been authorised. At the request of the competent authority of the Member State in which the application is submitted, the competent authority of the other Member State shall transmit within a period of one month, a confirmation that the reference medicinal product is or has been authorised together with the full composition of the reference product and if necessary other relevant documentation.
The ten-year period referred to in the second subparagraph shall be extended to a maximum of eleven years if, during the first eight years of those ten years, the marketing authorisation holder obtains an authorisation for one or more new therapeutic indications which, during the scientific evaluation prior to their authorisation, are held to bring a significant clinical benefit in comparison with existing therapies.
2
For the purposes of this Article:
a
‘
reference medicinal product
’
shall mean a medicinal product authorised under Article 6, in accordance with the provisions of Article 8;
b
‘
generic medicinal product
’
shall mean a medicinal product which has the same qualitative and quantitative composition in active substances and the same pharmaceutical form as the reference medicinal product, and whose bioequivalence with the reference medicinal product has been demonstrated by appropriate bioavailability studies. The different salts, esters, ethers, isomers, mixtures of isomers, complexes or derivatives of an active substance shall be considered to be the same active substance, unless they differ significantly in properties with regard to safety and/or efficacy. In such cases, additional information providing proof of the safety and/or efficacy of the various salts, esters or derivatives of an authorised active substance must be supplied by the applicant. The various immediate-release oral pharmaceutical forms shall be considered to be one and the same pharmaceutical form. Bioavailability studies need not be required of the applicant if he can demonstrate that the generic medicinal product meets the relevant criteria as defined in the appropriate detailed guidelines.
3
In cases where the medicinal product does not fall within the definition of a generic medicinal product as provided in paragraph 2(b) or where the bioequivalence cannot be demonstrated through bioavailability studies or in case of changes in the active substance(s), therapeutic indications, strength, pharmaceutical form or route of administration, vis-à-vis the reference medicinal product, the results of the appropriate pre-clinical tests or clinical trials shall be provided.
4
Where a biological medicinal product which is similar to a reference biological product does not meet the conditions in the definition of generic medicinal products, owing to, in particular, differences relating to raw materials or differences in manufacturing processes of the biological medicinal product and the reference biological medicinal product, the results of appropriate pre-clinical tests or clinical trials relating to these conditions must be provided. The type and quantity of supplementary data to be provided must comply with the relevant criteria stated in Annex I and the related detailed guidelines. The results of other tests and trials from the reference medicinal product's dossier shall not be provided.
5
In addition to the provisions laid down in paragraph 1, where an application is made for a new indication for a well-established substance, a non-cumulative period of one year of data exclusivity shall be granted, provided that significant pre-clinical or clinical studies were carried out in relation to the new indication.
6
Conducting the necessary studies and trials with a view to the application of paragraphs 1, 2, 3 and 4 and the consequential practical requirements shall not be regarded as contrary to patent rights or to supplementary protection certificates for medicinal products.
Substituted by Directive 2004/27/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/83/EC on the Community code relating to medicinal products for human use.