TITLE X

GENERAL PROVISIONS
Article 92
Member States shall communicate to each other all the information necessary to guarantee the quality and safety of homeopathic veterinary medicinal products manufactured and marketed within the Community, and in particular the information referred to in Articles 90 and 91.