TITLE X

GENERAL PROVISIONS
Article 91
1
Each Member State shall take all appropriate measures to ensure that the Agency is informed immediately of decisions granting marketing authorization and of all decisions refusing or withdrawing marketing authorization, cancelling a decision refusing or withdrawing marketing authorization, prohibiting supply or withdrawing a product from the market, together with the reasons on which such decisions are based.
2
The marketing authorization holder shall be obliged to notify the Member States forthwith of any action taken by him to suspend the marketing of a veterinary medicinal product or to withdraw a product from the market, together with the reasons for such action if it concerns the effectiveness of the veterinary medicinal product or the protection of public health. Member States shall ensure that this information is brought to the attention of the Agency.
3
Member States shall ensure that appropriate information about actions taken pursuant to paragraphs 1 and 2 which may affect the protection of health in third countries is forthwith brought to the attention of the relevant international organizations, with a copy to the Agency.