TITLE VIII

SUPERVISION AND SANCTIONS
Article 81
1
Member States shall take all appropriate measures to ensure that the marketing authorization holder and, where appropriate, the holder of the manufacturing authorization furnish proof of the control tests carried out on the veterinary medical product and/or on the constituents and intermediate products of the manufacturing process, in accordance with the methods laid down for the purposes of marketing authorization.
2
For the purposes of implementing paragraph 1, Member States may require the marketing authorization holder for immunological veterinary medicinal products to submit to the competent authorities copies of all the control reports signed by the qualified person in accordance with Article 55.
The marketing authorization holder for immunological veterinary medicinal products shall ensure that an adequate number of representative samples of each batch of veterinary medical products is held in stock at least up to the expiry date, and provide samples promptly to the competent authorities on request.