TITLE VII

PHARMACOVIGILANCE
Article 75
1
The marketing authorisation holder shall maintain detailed records of all suspected adverse reactions occurring within the Community or in a third country.
Save in exceptional circumstances, these reactions shall be communicated electronically in the form of a report in accordance with the guidelines referred to in Article 77(1).
2
The marketing authorisation holder shall record all suspected serious adverse reactions and human adverse reactions relating to the use of veterinary medicinal products that are brought to his attention, and report them promptly to the competent authority of the Member State on whose territory the incident occurred, and no later than 15 days following receipt of the information.
The marketing authorisation holder shall also record all suspected serious adverse reactions and human adverse reactions related to the use of veterinary medicinal products of which he can reasonably be expected to have knowledge, and report them promptly to the competent authority of Member State on whose territory the incident occurred, and no later than 15 days following receipt of the information.
3
The marketing authorisation holder shall ensure that all suspected serious unexpected adverse reactions, human adverse reactions and any suspected transmission via a veterinary medicinal product of any infectious agent occurring on the territory of a third country are reported promptly in accordance with the guidelines referred to in Article 77(1), so that they are available to the Agency and the competent authorities of the Member States in which the veterinary medicinal product is authorised, and no later than 15 days following the receipt of the information.
4
By way of derogation from paragraphs 2 and 3, in the case of veterinary medicinal products which are covered by Directive 87/22/EEC, have benefited from the authorisation procedures under Articles 31 and 32 of this Directive or have been the subject of the procedures provided for in Articles 36, 37 and 38 of this Directive, the marketing authorisation holder shall additionally ensure that all suspected serious adverse reactions and human adverse reactions occurring in the Community are reported in such a way so as to be accessible to the reference Member State or a competent authority designated as reference Member State. The reference Member State shall assume responsibility for the analysis and follow-up of any such adverse reactions.
5
Unless other requirements have been laid down as a condition for the granting of the marketing authorisation or subsequently as indicated in the guidelines referred to in Article 77(1), reports of all adverse reactions shall be submitted to the competent authorities in the form of a periodic safety update report, immediately upon request or at least every six months after authorisation until the placing on the market. Periodic safety update reports shall also be submitted immediately upon request or at least every six months during the first two years following the initial placing on the market and once a year for the following two years. Thereafter, the reports shall be submitted at three-yearly intervals, or immediately upon request.
The periodic safety update reports shall include a scientific evaluation of the risk-benefit balance of the veterinary medicinal product.
6
The Commission may amend paragraph 5 in the light of the experience gained from its operation.
Those measures, designed to amend non-essential elements of this Directive, shall be adopted in accordance with the regulatory procedure with scrutiny referred to in Article 89(2a).
7
Following the granting of a marketing authorisation, the holder of such authorisation may request the amendment of the periods referred to in paragraph 5 of this Article in accordance with the procedure laid down by Commission Regulation (EC) No 1084/2003 .
8
The holder of a marketing authorisation may not communicate information relating to pharmacovigilance concerns to the general public in relation to its authorised veterinary medicinal product without giving prior or simultaneous notification to the competent authority.
In any case, the marketing authorisation holder shall ensure that such information is presented objectively and is not misleading.
Member States shall take the necessary measures to ensure that a marketing authorisation holder who fails to discharge these obligations is subject to effective, proportionate and dissuasive penalties.
OJ L 159, 27.6.2003, p. 1 .
Substituted by Directive 2004/28/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/82/EC on the Community code relating to veterinary medicinal products.
Substituted by Regulation (EC) No 596/2009 of the European Parliament and of the Council of 18 June 2009 adapting a number of instruments subject to the procedure referred to in Article 251 of the Treaty to Council Decision 1999/468/EC with regard to the regulatory procedure with scrutiny Adaptation to the regulatory procedure with scrutiny — Part Four.