TITLE IV

MANUFACTURE AND IMPORTS
Article 56
Member States shall ensure that the obligations of qualified persons referred to in Article 52 are fulfilled, either by means of appropriate administrative measures or by making such persons subject to a professional code of conduct.
Member States may provide for the temporary suspension of such a person upon the commencement of administrative or disciplinary proceedings against him for failure to fulfil his obligations.