TITLE IV

MANUFACTURE AND IMPORTS
Article 55
1
Member States shall take all appropriate measures to ensure that the qualified person referred to in Article 52 is, without prejudice to his relationship with the holder of the manufacturing authorization, responsible, in the context of the procedures referred to in Article 56, for ensuring that:
a
in the case of veterinary medicinal products manufactured within the Member State concerned, each batch of veterinary medicinal products has been manufactured and checked in compliance with the laws in force in that Member State and in accordance with the requirements of the marketing authorization;
b
in the case of veterinary medicinal products coming from third countries, even if manufactured in the Community, each production batch imported has undergone in a Member State a full qualitative analysis, a quantitative analysis of at least all the active substances, and all the other tests or controls necessary to ensure the quality of veterinary medicinal products in accordance with the requirements of the marketing authorisation.
Batches of veterinary medicinal products which have undergone such controls in a Member State shall be exempt from the above controls if they are placed on the market in another Member State, accompanied by the control reports signed by the qualified person.
2
In the case of veterinary medicinal products imported from a third country, where appropriate arrangements have been made by the Community with the exporting country to ensure that the manufacturer of the veterinary medicinal product applies standards of good manufacturing practice at least equivalent to those laid down by the Community and to ensure that the controls referred to under point (b) of the first subparagraph of paragraph 1 have been carried out in the exporting country, the qualified person may be relieved of responsibility for carrying out those controls.
3
In all cases, and particularly where the veterinary medicinal products are released for sale, the qualified person shall certify, in a register or equivalent document provided for the purpose, that each production batch satisfies the provisions of this Article; the said register or equivalent document shall be kept up to date as operations are carried out and shall remain at the disposal of the representatives of the competent authority for the period specified in the provisions of the Member State concerned and, in any event, for at least five years.
Substituted by Directive 2004/28/EC of the European Parliament and of the Council of 31 March 2004 amending Directive 2001/82/EC on the Community code relating to veterinary medicinal products.