TITLE IV

MANUFACTURE AND IMPORTS
Article 48
If the holder of the manufacturing authorization requests a change in any of the particulars referred to in Article 45, first paragraph, (a) and (b), the time taken for the procedure relating to this request shall not exceed 30 days. In exceptional cases, this period of time may be extended to 90 days.