TITLE IV

MANUFACTURE AND IMPORTS
Article 46
1
The competent authority of the Member State shall not issue the manufacturing authorization until it has established the accuracy of the particulars supplied pursuant to Article 45 by means of an inquiry carried out by its representatives.
2
In order to ensure that the requirements referred to in Article 45 are complied with, authorization may be made conditional on the fulfilment of certain obligations imposed either when authorization is granted or at a later date.
3
The authorization shall apply only to the premises specified in the application and to the veterinary medicinal products and pharmaceutical forms specified in that application.