Directive 2001/80/EC of the European Parliament and of the Council
of 23 October 2001
on the limitation of emissions of certain pollutants into the air from large combustion plants (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2010/75/EU of the European Parliament and of the Council of 24 November 2010 on industrial emissions (integrated pollution prevention and control) (Recast) (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 17 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I CEILINGS AND REDUCTION TARGETS FOR EMISSIONS OF SO2 FROM EXISTING PLANTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II CEILINGS AND REDUCTION TARGETS FOR EMISSIONS OF NOX FROM EXISTING PLANTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III EMISSION LIMIT VALUES FOR SO2

Solid fuel
A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV EMISSION LIMIT VALUES FOR SO2

Liquid fuels
A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V EMISSION LIMIT VALUES FOR SO2

Gaseous fuels
A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI EMISSION LIMIT VALUES FOR NOX (MEASURED AS NO2)
A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Solid fuels (O2 content 6 %)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Liquid fuels (O2 content 3 %)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Gaseous fuels (O2 content 3 %)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Gas Turbines
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII EMISSION LIMIT VALUES FOR DUST
A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Solid fuels (O2 content 6 %)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Liquid fuels (O2 content 3 %)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Gaseous fuels (O2 content 3 %)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VIII METHODS OF MEASUREMENT OF EMISSIONS

A. Procedures for measuring and evaluating emissions from combustion plants.

1. Until 27 November 2004
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. From 27 November 2002 and without prejudice to Article 18(2)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. Determination of total annual emissions of combustion plants
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

C. Determination of the total annual emissions of existing plants until and including 2003.
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IX TIME-LIMITS FOR TRANSPOSITION AND IMPLEMENTATION OF THE REPEALED DIRECTIVE

ANNEX X CORRELATION TABLE