TITLE VIII

FINAL PROVISIONS
Article 111
1
Directives 79/279/EEC, 80/390/EEC, 82/121/EEC and 88/627/EEC, as amended by the acts listed in Annex II Part A, are hereby repealed without prejudice to the obligations of the Member States concerning the time-limits for transposition set out in Annex II Part B.
2
References to the repealed Directives shall be construed as references to this Directive and should be read in accordance with the correlation table shown in Annex III.