Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EC) No 333/2007 of 28 March 2007 laying down the methods of sampling and analysis for the official control of the levels of lead, cadmium, mercury, inorganic tin, 3-MCPD and benzo(a)pyrene in foodstuffs (Text with EEA relevance).