Single opinion
Article 7
For multi-centre clinical trials limited to the territory of a single Member State, Member States shall establish a procedure providing, notwithstanding the number of Ethics Committees, for the adoption of a single opinion for that Member State.
In the case of multi-centre clinical trials carried out in more than one Member State simultaneously, a single opinion shall be given for each Member State concerned by the clinical trial.