Notification of serious adverse reactions
Article 17
1
a
The sponsor shall ensure that all relevant information about suspected serious unexpected adverse reactions that are fatal or life-threatening is recorded and reported as soon as possible to the competent authorities in all the Member States concerned, and to the Ethics Committee, and in any case no later than seven days after knowledge by the sponsor of such a case, and that relevant follow-up information is subsequently communicated within an additional eight days.
b
All other suspected serious unexpected adverse reactions shall be reported to the competent authorities concerned and to the Ethics Committee concerned as soon as possible but within a maximum of fifteen days of first knowledge by the sponsor.
c
Each Member State shall ensure that all suspected unexpected serious adverse reactions to an investigational medicinal product which are brought to its attention are recorded.
d
The sponsor shall also inform all investigators.
2
Once a year throughout the clinical trial, the sponsor shall provide the Member States in whose territory the clinical trial is being conducted and the Ethics Committee with a listing of all suspected serious adverse reactions which have occurred over this period and a report of the subjects' safety.
3
a
Each Member State shall see to it that all suspected unexpected serious adverse reactions to an investigational medicinal product which are brought to its attention are immediately entered in a European database to which, in accordance with Article 11(1), only the competent authorities of the Member States, the Agency and the Commission shall have access.
b
The Agency shall make the information notified by the sponsor available to the competent authorities of the Member States.