PART D FINAL PROVISIONS

Article 36 Repeal
1. Directive 90/220/EEC shall be repealed on 17 October 2002.
2. References made to the repealed Directive shall be construed as being made to this Directive and should be read in accordance with the correlation table in Annex VIII.