Directive 2001/16/EC of the European Parliament and of the Council
of 19 March 2001
on the interoperability of the conventional rail system (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2008/57/EC of the European Parliament and of the Council of 17 June 2008 on the interoperability of the rail system within the Community (Recast) (Text with EEA relevance).

CHAPTER I General provisions
Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER II Technical specifications for interoperability (TSIs)
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III Interoperability constituents
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV Subsystems
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 17 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER V Notified bodies
Article 20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VI Committee and work programme
Article 21 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 21a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 21b . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 22 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 23 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VII Registers of infrastructure and rolling stock
Article 24 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VIII Transitional provisions
Article 25 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IX Final provisions
Article 26 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 27 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 28 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 29 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 30 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I THE TRANS-EUROPEAN CONVENTIONAL RAIL SYSTEM

1. INFRASTRUCTURE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. ROLLING STOCK
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. COMPATIBILITY OF THE TRANS-EUROPEAN CONVENTIONAL RAILWAY SYSTEM
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. EXTENSION OF THE SCOPE

1. Subcategories of lines and rolling stock
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Cost safeguards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II SUBSYSTEMS

1. LIST OF SUBSYSTEMS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. DESCRIPTION OF THE SUBSYSTEMS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1. Infrastructure:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Energy:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Control and command and signalling:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Traffic operation and management:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Telematics applications:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Rolling stock:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7. Maintenance:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III ESSENTIAL REQUIREMENTS

1. GENERAL REQUIREMENTS

1.1. Safety
1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Health
1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Environmental protection
1.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. REQUIREMENTS SPECIFIC TO EACH SUBSYSTEM

2.1. Infrastructure

2.1.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Energy

2.2.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2.2. Environmental protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Control and command and signalling

2.3.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Rolling stock

2.4.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.4. Controls
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Maintenance

2.5.1. Health and safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5.2. Environmental protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Operation and traffic management

2.6.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7. Telematics applications for freight and passengers

2.7.1. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.3. Health
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.4. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV CONFORMITY AND SUITABILITY FOR USE OF INTEROPERABILITY CONSTITUENTS

1. INTEROPERABILITY CONSTITUENTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1. Multiple-use constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Multiple-use constituents having specific characteristics
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Specific constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. SCOPE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. CONTENTS OF THE ‘EC’ DECLARATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V DECLARATION OF VERIFICATION OF SUBSYSTEMS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI VERIFICATION PROCEDURE FOR SUBSYSTEMS

1. INTRODUCTION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. STAGES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. CERTIFICATE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. TECHNICAL FILE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. MONITORING
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. SUBMISSION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. PUBLICATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. LANGUAGE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII MINIMUM CRITERIA WHICH MUST BE TAKEN INTO ACCOUNT BY THE MEMBER STATES WHEN NOTIFYING BODIES
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. The body and the staff responsible for the checks must carry out the checks with the greatest possible professional integrity and the greatest possible technical competence and must be free of any pressure and incentive, in particular of a financial type, which could affect their judgement or the results of their inspection, in particular from persons or groups of persons affected by the results of the checks.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. The staff responsible for the checks must possess:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VIII GENERAL RULES TO BE OBSERVED BY THE JOINT REPRESENTATIVE BODY (JRB)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repealed by Directive 2008/57/EC of the European Parliament and of the Council of 17 June 2008 on the interoperability of the rail system within the Community (Recast) (Text with EEA relevance).