Directive 2000/69/EC of the European Parliament and of the Council
of 16 November 2000
relating to limit values for benzene and carbon monoxide in ambient air (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2008/50/EC of the European Parliament and of the Council of 21 May 2008 on ambient air quality and cleaner air for Europe.

Article 1 Objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Benzene
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Carbon monoxide
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Assessment of concentrations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Committee
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Public information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Report and review
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Penalties
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Implementation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Addressees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I LIMIT VALUE FOR BENZENE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II LIMIT VALUE FOR CARBON MONOXIDE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III DETERMINATION OF REQUIREMENTS FOR ASSESSMENT OF CONCENTRATIONS OF BENZENE AND CARBON MONOXIDE IN AMBIENT AIR WITHIN A ZONE OR AGGLOMERATION

I. Upper and lower assessment thresholds
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

II. Determination of exceedances of upper and lower assessment thresholds
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV LOCATION OF SAMPLING POINTS FOR THE MEASUREMENT OF CONCENTRATIONS OF BENZENE AND CARBON MONOXIDE IN AMBIENT AIR
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

I. Macroscale siting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

II. Microscale siting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

III. Documentation and review of site selection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V CRITERIA FOR DETERMINING NUMBERS OF SAMPLING POINTS FOR FIXED MEASUREMENT OF CONCENTRATIONS OF BENZENE AND CARBON MONOXIDE IN AMBIENT AIR
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI DATA QUALITY OBJECTIVES AND COMPILATION OF RESULTS OF AIR QUALITY ASSESSMENT

I. Data quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

II. Results of air quality assessment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

III. Standardisation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII REFERENCE METHODS FOR ASSESSMENT OF CONCENTRATIONS OF BENZENE AND CARBON MONOXIDE

I. Reference method for the sampling/analysis of benzene
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

II. Reference method for the analysis of carbon monoxide
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

III. Reference modelling techniques
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .