ANNEX IX

EMISSION LIMIT VALUES AND ENVIRONMENTAL QUALITY STANDARDS
The ‘limit values’ and ‘quality objectives’ established under the re Directives of Directive 76/464/EEC shall be considered emission limit values and environmental quality standards, respectively, for the purposes of this Directive. They are established in the following Directives:
1. The Mercury Discharges Directive (82/176/EEC) ;
2. The Cadmium Discharges Directive (83/513/EEC) ;
3. The Mercury Directive (84/156/EEC) ;
4. The Hexachlorocyclohexane Discharges Directive (84/491/EEC) ; and
5. The Dangerous Substance Discharges Directive (86/280/EEC) .
OJ L 81, 27.3.1982, p. 29.
OJ L 291, 24.10.1983, p. 1.
OJ L 74, 17.3.1984, p. 49.
OJ L 274, 17.10.1984, p. 11.
OJ L 181, 4.7.1986, p. 16.