CHAPTER I
GENERAL PROVISIONS
Article 1
Objective
Article 2
Definitions
Article 3
Scope — Determination and assessment of risks
Article 4
Application of the various Articles in relation to assessment of risks
CHAPTER II
EMPLOYERS' OBLIGATIONS
Article 5
Replacement
Article 6
Reduction of risks
Article 7
Information for the competent authority
Article 8
Hygiene and individual protection
Article 9
Information and training of workers
Article 10
Worker information in particular cases
Article 11
List of exposed workers
Article 12
Consultation and participation of workers
Article 13
Notification to the competent authority
CHAPTER III
MISCELLANEOUS PROVISIONS
Article 14
Health surveillance
Article 15
Health and veterinary care facilities other than diagnostic laboratories
Article 16
Special measures for industrial processes, laboratories and animal rooms
Article 17
Use of data
Article 18
Classification of biological agents
Article 19
Annexes
Article 20
Notifying the Commission
Article 21
Repeal
Article 22
Entry into force
Article 23
Addresses
ANNEX I
INDICATIVE LIST OF ACTIVITIES
Preliminary note
ANNEX II
BIOHAZARD SIGN
ANNEX III
COMMUNITY CLASSIFICATION
Article 2, second paragraph, and Article 18
INTRODUCTORY NOTES
1.
In line with the scope of the Directive, only agents...
2.
The list of classified agents is based on the effect...
3.
Biological agents which have not been classified for inclusion in...
4.
Where a strain is attenuated or has lost known virulence...
5.
The nomenclature of classified agents used to establish this list...
6.
The list of classified biological agents reflects the state of...
7.
Member States are to ensure that all viruses which have...
8.
Certain biological agents classified in group 3 which are indicated...
9.
The requirements as to containment consequent on the classification of...
10.
This list also gives a separate indication in cases where...
BACTERIA
and similar organisms
VIRUSES (*)
PRION DISEASE AGENTS
PARASITES
FUNGI
ANNEX IV
PRACTICAL RECOMMENDATIONS FOR THE HEALTH SURVEILLANCE OF WORKERS
1.
The doctor and/or the authority responsible for the health surveillance...
2.
Health surveillance of workers must be carried out in accordance...
ANNEX V
INDICATIONS CONCERNING CONTAINMENT MEASURES AND CONTAINMENT LEVELS
Preliminary note
ANNEX VI
CONTAINMENT FOR INDUSTRIAL PROCESSES
Preliminary note
ANNEX VII
RECOMMENDED CODE OF PRACTICE ON VACCINATION
1.
If the assessment referred to in Article 3(2) reveals that...
2.
Vaccination should be carried out in accordance with national law...
3.
Vaccination must be offered free of charge to workers.
4.
A vaccination certificate may be drawn up which should be...
ANNEX VIII
PART A
Repealed Directive with its successive amendments
PART B
ANNEX IX
﻿Directive 2000/54/EC of the European Parliament and of the Council
of 18 September 2000
on the protection of workers from risks related to exposure to biological agents at work
(seventh individual directive within the meaning of Article 16(1) of Directive 89/391/EEC)