Early warning report
Article 5b
1
The Commission shall, in cooperation with the European Environment Agency, draw up a report on the progress towards the attainment of the targets laid down in Article 5(5) and (6) at the latest three years before each deadline laid down therein.
2
The reports referred to in paragraph 1 shall include the following:
a
an estimation of the attainment of the targets by each Member State;
b
a list of Member States at risk of not attaining the targets within the respective deadlines accompanied by appropriate recommendations for the Member States concerned;
c
examples of best practices that are used throughout the Union which could provide guidance for progressing towards attaining the targets.
Inserted by Directive (EU) 2018/850 of the European Parliament and of the Council of 30 May 2018 amending Directive 1999/31/EC on the landfill of waste (Text with EEA relevance).