Article 5
1
To facilitate efficient official monitoring of dietary foods for special medical purposes, when a product is placed on the market, the manufacturer, or where a product is manufactured in a third country, the importer, shall notify the competent authority of the Member States where the product is being marketed by forwarding to it a model of the label used for the product. Member States may, if they can demonstrate that notification is not necessary in order to monitor those products efficiently in their territory, not impose that obligation.
2
The competent authorities within the meaning of this Article are those referred to in Article 9(4) of Directive 89/398/EEC.