Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Delegated Regulation (EU) 2016/128 of 25 September 2015 supplementing Regulation (EU) No 609/2013 of the European Parliament and of the Council as regards the specific compositional and information requirements for food for special medical purposes (Text with EEA relevance).