Directive 98/8/EC of the European Parliament and of the Council
of 16 February 1998
concerning the placing of biocidal products on the market (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EU) No 528/2012 of the European Parliament and of the Council of 22 May 2012 concerning the making available on the market and use of biocidal products (Text with EEA relevance).