CHAPTER IV

Deposit, access and re-deposit of a biological material
Article 14
1
If the biological material deposited in accordance with Article 13 ceases to be available from the recognised depositary institution, a new deposit of the material shall be permitted on the same terms as those laid down in the Budapest Treaty.
2
Any new deposit shall be accompanied by a statement signed by the depositor certifying that the newly deposited biological material is the same as that originally deposited.