CHAPTER II

Scope of protection
Article 10
The protection referred to in Articles 8 and 9 shall not extend to biological material obtained from the propagation or multiplication of biological material placed on the market in the territory of a Member State by the holder of the patent or with his consent, where the multiplication or propagation necessarily results from the application for which the biological material was marketed, provided that the material obtained is not subsequently used for other propagation or multiplication.