Directive 98/37/EC of the European Parliament and of the Council
of 22 June 1998
on the approximation of the laws of the Member States relating to machinery (repealed)

CHAPTER I SCOPE, PLACING ON THE MARKET AND FREEDOM OF MOVEMENT
Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2006/42/EC of the European Parliament and of the Council of 17 May 2006 on machinery, and amending Directive 95/16/EC (recast) (Text with EEA relevance).

CHAPTER II CONFORMITY ASSESSMENT PROCEDURES
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III CE MARKING
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV FINAL PROVISIONS
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I ESSENTIAL HEALTH AND SAFETY REQUIREMENTS RELATING TO THE DESIGN AND CONSTRUCTION OF MACHINERY AND SAFETY COMPONENTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PRELIMINARY OBSERVATIONS
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1 ESSENTIAL HEALTH AND SAFETY REQUIREMENTS

1.1. General remarks

1.1.1. Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1.2. Principles of safety integration
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1.3. Materials and products
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1.4. Lighting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1.5. Design of machinery to facilitate its handling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Controls

1.2.1. Safety and reliability of control systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.2. Control devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.3. Starting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.4. Stopping device

Normal stopping
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Emergency stop
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Complex installations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.5. Mode selection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.6. Failure of the power supply
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.7. Failure of the control circuit
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.8. Software
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Protection against mechanical hazards

1.3.1. Stability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.2. Risk of break-up during operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.3. Risks due to falling or ejected objects
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.4. Risks due to surfaces, edges or angles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.5. Risks related to combined machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.6. Risks relating to variations in the rotational speed of tools
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.7. Prevention of risks related to moving parts
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.8. Choice of protection against risks related to moving parts
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

A. Moving transmission parts
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. Moving parts directly involved in the process
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Required characteristics of guards and protection devices

1.4.1. General requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2. Special requirements for guards

1.4.2.1. Fixed guards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2.2. Movable guards
A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2.3. Adjustable guards restricting access
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3. Special requirements for protection devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5. Protection against other hazards

1.5.1. Electricity supply
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.2. Static electricity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.3. Energy supply other than electricity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.4. Errors of fitting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.5. Extreme temperatures
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.6. Fire
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.7. Explosion
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.8. Noise
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.9. Vibration
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.10. Radiation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.11. External radiation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.12. Laser equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.13. Emissions of dust, gases, etc.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.14. Risk of being trapped in a machine
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.15. Risk of slipping, tripping or falling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6. Maintenance

1.6.1. Machinery maintenance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.2. Access to operating position and servicing points
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.3. Isolation of energy sources
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.4. Operator intervention
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.5. Cleaning of internal parts
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7. Indicators

1.7.0. Information devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7.1. Warning devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7.2. Warning of residual risks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7.3. Marking
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7.4. Instructions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. ESSENTIAL HEALTH AND SAFETY REQUIREMENTS FOR CERTAIN CATEGORIES OF MACHINERY

2.1. Agri-foodstuffs machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Instructions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Portable hand-held and/or hand-guided machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Instructions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Machinery for working wood and analogous materials
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. ESSENTIAL HEALTH AND SAFETY REQUIREMENTS TO OFFSET THE PARTICULAR HAZARDS DUE TO THE MOBILITY OF MACHINERY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1. General

3.1.1. Definition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.2. Lighting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.3. Design of machinery to facilitate its handling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Work stations

3.2.1. Driving position
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.2. Seating
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.3. Other places
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Controls

3.3.1. Control devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.2. Starting/moving
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.3. Travelling function
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.4. Movement of pedestrian-controlled machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.5. Control circuit failure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4. Protection against mechanical hazards

3.4.1. Uncontrolled movements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4.2. Risk of break-up during operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4.3. Rollover
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4.4. Falling objects
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4.5. Means of access
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4.6. Towing devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4.7. Transmission of power between self-propelled machinery (or tractor) and recipient machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4.8. Moving transmission parts
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.5. Protection against other hazards

3.5.1. Batteries
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.5.2. Fire
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.5.3. Emissions of dust, gases, etc.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.6. Indications

3.6.1. Signs and warning
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.6.2. Marking
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.6.3. Instruction handbook
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. ESSENTIAL HEALTH AND SAFETY REQUIREMENTS TO OFFSET THE PARTICULAR HAZARDS DUE TO A LIFTING OPERATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1. General remarks

4.1.1. Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2. Protection against mechanical hazards

4.1.2.1. Risks due to lack of stability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2.2. Guide rails and rail tracks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2.3. Mechanical strength
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2.4. Pulleys, drums, chains or ropes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2.5. Separate lifting accessories
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2.6. Control of movements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2.7. Handling of loads
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1.2.8. Lightning
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2. Special requirements for machinery whose power source is other than manual effort

4.2.1. Controls

4.2.1.1. Driving position
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.1.2. Seating
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.1.3. Control devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.1.4. Loading control
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.2. Installation guided by cables
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.3. Risks to exposed persons. Means of access to driving position and intervention points
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.4. Fitness for purpose
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3. Marking

4.3.1. Chains and ropes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3.2. Lifting accessories
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3.3. Machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.4. Instruction handbook

4.4.1. Lifting accessories
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.4.2. Machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. ESSENTIAL HEALTH AND SAFETY REQUIREMENTS FOR MACHINERY INTENDED FOR UNDERGROUND WORK
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.1. Risks due to lack of stability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2. Movement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.3. Lighting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.4. Control devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.5. Stopping
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.6. Fire
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.7. Emissions of dust, gases, etc.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. ESSENTIAL HEALTH AND SAFETY REQUIREMENTS TO OFFSET THE PARTICULAR HAZARDS DUE TO THE LIFTING OR MOVING OF PERSONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.1. General

6.1.1. Definition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.1.2. Mechanical strength
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.1.3. Loading control for types of device moved by power other than human strength
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2. Controls
6.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3. Risks of persons falling from the carrier
6.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.4. Risks of the carrier falling or overturning
6.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.5. Markings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX II

A. Contents of the EC declaration of conformity for machinery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. Contents of the declaration by the manufacturer or his authorised representatives established in the Community (Article 4(2))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

C. Contents of the EC declaration of conformity for safety components placed on the market separately
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III CE CONFORMITY MARKING
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV TYPES OF MACHINERY AND SAFETY COMPONENTS FOR WHICH THE PROCEDURE REFERRED TO IN ARTICLE 8(2)(b) AND (c) MUST BE APPLIED

A. Machinery
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. Safety components
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V EC DECLARATION OF CONFORMITY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI EC TYPE-EXAMINATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII MINIMUM CRITERIA TO BE TAKEN INTO ACCOUNT BY MEMBER STATES FOR THE NOTIFICATION OF BODIES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX VIII

Part A Repealed Directives
(referred to by Article 14)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Part B List of deadlines for transposition into and application in national law
(referred to by Article 14)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX IX . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .