Council Directive 97/43/Euratom
of 30 June 1997
on health protection of individuals against the dangers of ionizing radiation in relation to medical exposure, and repealing Directive 84/466/Euratom (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Directive 2013/59/Euratom of 5 December 2013 laying down basic safety standards for protection against the dangers arising from exposure to ionising radiation, and repealing Directives 89/618/Euratom, 90/641/Euratom, 96/29/Euratom, 97/43/Euratom and 2003/122/Euratom.

Article 1 Purpose and scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Justification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Optimization
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Responsibilities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Procedures
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Training
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Special Practices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Special protection during pregnancy and breastfeeding
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Potential exposure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Estimates of population doses
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 13 Inspection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14 Transposition into Member State law
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 15 Repeal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repealed by Council Directive 2013/59/Euratom of 5 December 2013 laying down basic safety standards for protection against the dangers arising from exposure to ionising radiation, and repealing Directives 89/618/Euratom, 90/641/Euratom, 96/29/Euratom, 97/43/Euratom and 2003/122/Euratom.