Directive 97/33/EC of the European Parliament and of the Council
of 30 June 1997
on interconnection in Telecommunications with regard to ensuring universal service and interoperability through application of the principles of Open Network Provision (ONP) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2002/21/EC of the European Parliament and of the Council of 7 March 2002 on a common regulatory framework for electronic communications networks and services (Framework Directive).

Article 1 Scope and aim
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Interconnection at national and Community level
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Rights and obligations for interconnection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Interconnection and universal service contributions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Non-discrimination and transparency
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Principles for interconnection charges and cost accounting systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Accounting separation and financial reports
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 General responsibilities of the national regulatory authorities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Essential requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Collocation and facility sharing
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Numbering
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 13 Technical standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14 Publication of and access to information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 15 Advisory Committee procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 16 Regulatory Committee procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 17 Procedure for resolving disputes between organizations operating under authorizations provided by different Member States
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 18 Notification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 19 Technical adjustment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 20 Deferment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 21 Interconnection with third country organizations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 22 Review
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 23 Transposition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 24 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 25 Addressees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I SPECIFIC PUBLIC TELECOMMUNICATIONS NETWORKS AND PUBLICLY AVAILABLE TELECOMMUNICATIONS SERVICES
(referred to in Article 3 (2))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part 1

The fixed public telephone network
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

The fixed public telephone service according to Directive 95/62/EC of the European Parliament and of the Council of 13 December 1995 on the application of open network provision (ONP) to voice telephony.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part 2

The leased lines service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part 3

Public mobile telephone networks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Public mobile telephone services
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II ORGANIZATIONS WITH RIGHTS AND OBLIGATIONS TO NEGOTIATE INTERCONNECTION WITH EACH OTHER IN ORDER TO ENSURE COMMUNITY-WIDE SERVICES
(referred to in Article 4 (1))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III CALCULATING THE COST OF UNIVERSAL SERVICE OBLIGATIONS FOR VOICE TELEPHONY
(referred to in Article 5 (3))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV LIST OF EXAMPLES OF ELEMENTS FOR INTERCONNECTION CHARGES
(referred to in Article 7 (3))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V COST ACCOUNTING SYSTEMS FOR INTERCONNECTION
(referred to in Article 7 (5))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI THRESHOLDS FOR TELECOMMUNICATIONS TURNOVER
(referred to in Article 8 (1) and 8 (2))
Part 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII FRAMEWORK FOR NEGOTIATION OF INTERCONNECTION AGREEMENTS
(referred to in Article 9 (2))
Part 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .