Directive 97/23/EC of the European Parliament and of the Council
of 29 May 1997
on the approximation of the laws of the Member States concerning pressure equipment (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2014/68/EU of the European Parliament and of the Council of 15 May 2014 on the harmonisation of the laws of the Member States relating to the making available on the market of pressure equipment Text with EEA relevance.