Directive 96/79/EC of the European Parliament and of the Council
of 16 December 1996
on the protection of occupants of motor vehicles in the event of a frontal impact and amending Directive 70/156/EEC (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EC) No 661/2009 of the European Parliament and of the Council of 13 July 2009 concerning type-approval requirements for the general safety of motor vehicles, their trailers and systems, components and separate technical units intended therefor (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I ADMINISTRATIVE PROVISIONS FOR THE TYPE-APPROVAL OF A VEHICLE TYPE

1. APPLICATION FOR EC TYPE-APPROVAL
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. EC TYPE-APPROVAL
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. MODIFICATION OF THE TYPE AND AMENDMENTS TO TYPE-APPROVALS
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. CONFORMITY OF PRODUCTION
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 1 Information document No …
pursuant to Annex I to Directive 70/156/EEC relating to the EC type-approval of a vehicle with regard to the protection of occupants of motor vehicles in the event of a frontal impact
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

0. General
0.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. General construction characteristics of the vehicle
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Masses and dimensions (e) (in kg and mm) (refer to drawing where applicable)
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Steering
7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9. Bodywork
9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 2 MODEL
(maximum format: A4 (210 × 297 mm)
EC TYPE-APPROVAL CERTIFICATE

Addendum
to EC type-approval certificate No …
concerning the type-approval of a vehicle with regard to Directive …/…/EC

1. Additional information
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II TECHNICAL REQUIREMENTS

1. SCOPE
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. DEFINITIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. REQUIREMENTS

3.1. General specification applicable to all tests
3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Specifications
3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 1 TEST PROCEDURE

1. INSTALLATION AND PREPARATION OF THE VEHICLE

1.1. Testing ground
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Barrier
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Orientation of the barrier
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.1. Alignment of the vehicle to the barrier
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. State of vehicle

1.4.1. General specification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2. Mass of the vehicle
1.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3. Passenger compartment adjustments

1.4.3.1. Position of steering wheel
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.2. Glazing
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.3. Gear-change lever
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.4. Pedals
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.5. Doors
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.6. Opening roof
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.7. Sun-visor
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.8. Rear-view mirror
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.9. Arm-rests
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.10. Head restraints
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.11. Seats
1.4.3.11.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.3.11.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.3.11.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. DUMMIES

2.1. Front seats
2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. PROPULSION AND COURSE OF VEHICLE
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. TEST SPEED
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. MEASUREMENTS TO BE MADE ON DUMMY IN FRONT SEATS
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2.1. Measurements in the head of the dummy
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2.2. Measurements in the neck of the dummy
5.2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2.3. Measurements in the thorax of the dummy
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2.4. Measurements in the femur and tibia of the dummy
5.2.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. MEASUREMENTS TO BE MADE ON THE VEHICLE
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 2 DETERMINATION OF PERFORMANCE CRITERIA

1. HEAD PERFORMANCE CRITERION (HPC)
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. NECK INJURY CRITERIA (NIC)
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. THORAX COMPRESSION CRITERION (ThCC) AND VISCOUS CRITERION (V*C)
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. FEMUR FORCE CRITERION (FFC)
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. TIBIA COMPRESSIVE FORCE CRITERION (TCFC) AND TIBIA INDEX (TI)
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. PROCEDURE FOR CALCULATING THE VISCOUS CRITERION (V*C) FOR HYBRID III DUMMY
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 3 ARRANGEMENT AND INSTALLATION OF DUMMIES AND ADJUSTMENT OF RESTRAINT SYSTEMS

1. ARRANGEMENT OF DUMMIES

1.1. Separate seats
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Front bench seat

1.2.1. Driver
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.2. Outer passenger
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Bench seat for front passengers (not including driver)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. INSTALLATION OF DUMMIES

2.1. Head
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Arms
2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Hands
2.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Torso
2.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.3. Lower torso

2.4.3.1. ‘H’ point
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.3.2. Pelvic angle
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Legs
2.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Feet
2.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.9. Dummy clothing
2.9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. ADJUSTMENT OF RESTRAINT SYSTEM
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 4 TEST PROCEDURE WITH TROLLEY

1. TEST INSTALLATION AND PROCEDURE

1.1. Trolley
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. State of the structure

1.2.1. General
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.2. Adjustments
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Attachment of the structure
1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Dummies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5. Measuring apparatus

1.5.1. Deceleration of the structure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.2. Measurements to be made on the dummies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6. Deceleration curve of the structure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7. Reference curve ΔV = f(t) of the vehicle concerned
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.8. Equivalent method
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 5 TECHNIQUE OF MEASUREMENT IN MEASUREMENT TESTS: INSTRUMENTATION

1. DEFINITIONS

1.1. Data channel
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Transducer
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Channel amplitude class: CAC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Characteristic frequencies FH, FL, FN
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5. Channel frequency class: CFC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6. Sensitivity coefficient
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7. Calibration factor of a data channel
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.8. Linearity error
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.9. Cross sensitivity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.10. Phase delay time
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.11. Environment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. PERFORMANCE REQUIREMENTS

2.1. Linearity error
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Amplitude against frequency
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Phase delay time
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Time base
2.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.2. Relative time delay
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Transducer cross sensitivity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Calibration

2.6.1. General
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.2. Accuracy of reference equipment for calibration
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.2.1. Static calibration
2.6.2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6.2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.2.2. Dynamic calibration
2.6.2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.2.3. Time
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.3. Sensitivity coefficient and linearity error
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.4. Calibration of the frequency response
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7. Environmental effects
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.8. Choice and designation of the data channel
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. MOUNTING OF TRANSDUCERS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. RECORDING

4.1. Analogue magnetic recorder
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2. Digital magnetic recorder
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3. Paper tape recorder
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. DATA PROCESSING

5.1. Filtering
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2. Digitalizing
5.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2.2. Amplitude resolution
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. PRESENTATION OF RESULTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 6 DEFINITION OF THE DEFORMABLE BARRIER

1. COMPONENT AND MATERIAL SPECIFICATIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. ALUMINIUM HONEYCOMB CERTIFICATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1. Sample locations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Sample size
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Area measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Crush rate and distance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Data collection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Crush strength determination
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7. Sample crush strength specification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.8. Block crush strength specification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. ADHESIVE BONDING PROCEDURE
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. CONSTRUCTION
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. MOUNTING
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 7 CERTIFICATION PROCEDURE FOR THE DUMMY LOWER LEG AND FOOT

1. UPPER FOOT IMPACT TEST
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Test procedure
1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Performance specification
1.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. LOWER FOOT IMPACT TEST WITHOUT SHOE
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Test procedure
2.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Performance specification
2.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. LOWER FOOT IMPACT TEST (WITH SHOE)
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Test procedure
3.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4. Performance specification
3.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Figure 1
Upper foot impact test
Test set-up specifications

Figure 2
Lower foot impact test (without shoe)
Test set-up specifications

Figure 3
Lower foot impact test (with shoe)
Test set-up specifications

Figure 4 Pendulum impactor