Directive 94/9/EC of the European Parliament and the Council
of 23 March 1994
on the approximation of the laws of the Member States concerning equipment and protective systems intended for use in potentially explosive atmospheres (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2014/34/EU of the European Parliament and of the Council of 26 February 2014 on the harmonisation of the laws of the Member States relating to equipment and protective systems intended for use in potentially explosive atmospheres (recast) Text with EEA relevance.

CHAPTER I Scope, placing on the market and freedom of movement
Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER II Conformity assessment procedures
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III CE conformity marking
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV Final provisions
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I CRITERIA DETERMINING THE CLASSIFICATION OF EQUIPMENT-GROUPS INTO CATEGORIES

1. Equipment-group I
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Equipment-group II
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II ESSENTIAL HEALTH AND SAFETY REQUIREMENTS RELATING TO THE DESIGN AND CONSTRUCTION OF EQUIPMENT AND PROTECTIVE SYSTEMS INTENDED FOR USE IN POTENTIALLY EXPLOSIVE ATMOSPHERES

Preliminary observations
A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. COMMON REQUIREMENTS FOR EQUIPMENT AND PROTECTIVE SYSTEMS

1.0. General requirements

1.0.1. Principles of integrated explosion safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.0.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.0.3. Special checking and maintenance conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.0.4. Surrounding area conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.0.5. Marking
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.0.6. Instructions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1. Selection of materials
1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Design and Construction
1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.3. Enclosed structures and prevention of leaks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.4. Dust deposits
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.5. Additional means of protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.6. Safe opening
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.7. Protection against other hazards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.8. Overloading of equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2.9. Flameproof enclosure systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Potential ignition sources

1.3.1. Hazards arising from different ignition sources
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.2. Hazards arising from static electricity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.3. Hazards arising from stray electric and leakage currents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.4. Hazards arising from overheating
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.5. Hazards arising from pressure compensation operations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Hazards arising from external effects
1.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5. Requirements in respect of safety-related devices
1.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.4. Control and display units
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.5. Requirements in respect of devices with a measuring function for explosion protection.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5.8. Risks arising from software
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6. Integration of safety requirements relating to the system
1.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.3. Hazards arising from power failure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.4. Hazards arising from connections
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.5. Placing of warning devices as parts of equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. SUPPLEMENTARY REQUIREMENTS IN RESPECT OF EQUIPMENT

2.0. Requirements applicable to equipment in category M of equipment-group I

2.0.1. Requirements applicable to equipment in category M 1 of equipment-group I
2.0.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.0.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.0.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.0.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.0.2. Requirements applicable to equipment in category M 2 of equipment-group I
2.0.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.0.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.0.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1. Requirements applicable to equipment in category 1 of equipment-group II

2.1.1. Explosive atmospheres caused by gases, vapours or mists
2.1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1.2. Explosive atmospheres caused by air/dust mixtures
2.1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Requirements for category 2 of equipment-group II

2.2.1. Explosive atmospheres caused by gases, vapours or mists
2.2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2.2. Explosive atmospheres caused by air/dust mixtures
2.2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Requirements applicable to equipment in category 3 of equipment-group II

2.3.1. Explosive atmospheres caused by gases, vapours or mists
2.3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2. Explosive atmospheres caused by air/dust mixtures
2.3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. SUPPLEMENTARY REQUIREMENTS IN RESPECT OF PROTECTIVE SYSTEMS

3.0. General requirements
3.0.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.0.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.0.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.0.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1. Planning and design

3.1.1. Characteristics of materials
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.5. Pressure-relief systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.6. Explosion suppression systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.7. Explosion decoupling systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III MODULE EC-TYPE EXAMINATION
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV MODULE: PRODUCTION QUALITY ASSURANCE
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Quality system
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Surveillance under the responsibility of the notified body
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V MODULE: PRODUCT VERIFICATION
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Verification by examination and testing of each piece of equipment.
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI MODULE: CONFORMITY TO TYPE
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII MODULE: PRODUCT QUALITY ASSURANCE
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Quality system
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Surveillance under the responsibility of the notified body
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VIII MODUL: INTERNAL CONTROL OF PRODUCTION
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IX MODULE: UNIT VERIFICATION
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX X

A. CE Marking
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. Content of the EC declaration of conformity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX XI MINIMUM CRITERIA TO BE TAKEN INTO ACCOUNT BY MEMBER STATES FOR THE NOTIFICATION OF BODIES
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repealed by Directive 2014/34/EU of the European Parliament and of the Council of 26 February 2014 on the harmonisation of the laws of the Member States relating to equipment and protective systems intended for use in potentially explosive atmospheres (recast) Text with EEA relevance.